xS(1)
=====
:doctype: manpage
:manmanual: xK Manual
:mansource: xK {release-version}

Name
----
xS - IRC daemon

Synopsis
--------
*xS* [_OPTION_]...

Description
-----------
*xS* is a basic IRC daemon for single-server networks, suitable for testing
and private use.  When run without a configuration file, it will start listening
on the standard port 6667 and the "any" address.

Options
-------
*-debug*::
	Do not daemonize, print more information on the standard error stream
	to help debug various issues.

*-systemd*::
	Log using the format specified in *sd-daemon*(3).

*-h*, *-help*::
	Display a help message and exit.

*-version*::
	Output version information and exit.

*-writedefaultcfg*::
	Write a configuration file with defaults, show its path and exit.
+
The file will be appropriately commented.

Files
-----
*xS* follows the XDG Base Directory Specification.

_~/.config/xS/xS.conf_::
_/etc/xdg/xS/xS.conf_::
	The daemon's configuration file.  Use the *-writedefaultcfg* option
	to create a new one for editing.

Reporting bugs
--------------
Use https://git.janouch.name/p/xK to report bugs, request features,
or submit pull requests.

See also
--------
*sd-daemon*(3)
