From a04dfc59feac440ca6f2b5d5237838d79547382a Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Wed, 2 Sep 2020 19:59:21 +0200
Subject: README: improve libasciidoc compatibility

---
 README.adoc | 7 +++++--
 1 file changed, 5 insertions(+), 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 3fa197a..e9dcf20 100644
--- a/README.adoc
+++ b/README.adoc
@@ -52,8 +52,9 @@ Not supported:
    be used to implement this feature if needed
  - limits of almost any kind, just connections and mode `+l`
 
-This program has been https://git.janouch.name/p/haven/src/branch/master/hid[
-ported to Go], and development continues over there.
+This program has been
+https://git.janouch.name/p/haven/src/branch/master/hid[ported to Go],
+and development continues over there.
 
 ZyklonB
 -------
@@ -132,6 +133,7 @@ Custom Key Bindings in degesch
 ------------------------------
 The default and preferred frontend used in 'degesch' is GNU Readline.  This
 means that you can change your bindings by editing '~/.inputrc'.  For example:
+
 ....
 # Preload with system-wide settings
 $include /etc/inputrc
@@ -142,6 +144,7 @@ $if degesch
 "\e\e[D": move-buffer-left
 $endif
 ....
+
 Consult the source code and the GNU Readline manual for a list of available
 functions.  Also refer to the latter for the exact syntax of this file.
 Beware that you can easily break the program if you're not careful.
-- 
cgit v1.2.3

