From 2fe3b95ecd21cdd1991d3d5ab3aa989531be2cf2 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Sat, 31 Oct 2020 19:56:21 +0100
Subject: README.adoc: improve backlog helper invocation

When fancy-prompt.lua is enabled, tho prompt is two-lined
and a simple PageUp would skip one line of content.

It works slightly better than it should: when there's under
a page of content to scroll, there is no shift at all.
---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 6480231..550fda9 100644
--- a/README.adoc
+++ b/README.adoc
@@ -159,7 +159,7 @@ black on white terminals.
 
  /set behaviour.date_change_line = "%a %e %b %Y"
  /set behaviour.plugin_autoload += "fancy-prompt.lua"
- /set behaviour.backlog_helper = "LESSSECURE=1 less -R +Gb -Ps'Backlog ?ltlines %lt-%lb?L/%L. .?e(END):?pB%pB\\%..'"
+ /set behaviour.backlog_helper = "LESSSECURE=1 less -R +Gb1d -Ps'Backlog ?ltlines %lt-%lb?L/%L. .?e(END):?pB%pB\\%..'"
  /set attributes.userhost = "\x1b[38;5;109m"
  /set attributes.join = "\x1b[38;5;108m"
  /set attributes.part = "\x1b[38;5;138m"
-- 
cgit v1.2.3

