From 0be43691d09176c39b8345953dae6e29b5e122cf Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Sat, 23 Jul 2016 20:29:25 +0200
Subject: Update README

---
 README.adoc | 11 +++++++++++
 1 file changed, 11 insertions(+)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 9510721..b83176c 100644
--- a/README.adoc
+++ b/README.adoc
@@ -142,6 +142,17 @@ Consult the source code and the GNU Readline manual for a list of available
 functions.  Also refer to the latter for the exact syntax of this file.
 Beware that you can easily break the program if you're not careful.
 
+Configuration profiles
+----------------------
+Even though the applications don't directly support configuration profiles,
+they conform to the XDG standard, and thus you can change the location they
+load configuration from via XDG_CONFIG_HOME (normally '~/.config') and the
+location where store their data via XDG_DATA_HOME (normally '~/.local/share').
+
+It would be relatively easy to make the applications assume whatever name you
+run them under (for example by using symbolic links), and load different
+configurations accordingly, but I consider it rather messy and unnecessary.
+
 Contributing and Support
 ------------------------
 Use this project's GitHub to report any bugs, request features, or submit pull
-- 
cgit v1.2.3

