From 781fd392fe0cde3d281060a59df38d1745658b04 Mon Sep 17 00:00:00 2001
From: Přemysl Eric Janouch <p@janouch.name>
Date: Tue, 26 Nov 2024 03:27:09 +0100
Subject: README.adoc: fix a typo

---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 5a7772a..80e7de6 100644
--- a/README.adoc
+++ b/README.adoc
@@ -20,7 +20,7 @@ and may not run at the same time, as it would contend for device access.
 eizoctltray
 ~~~~~~~~~~~
 _eizoctltray_ is a derived Windows utility that can stay in the systray.
-When holding the Shift or Control keys while switching singnal inputs,
+When holding the Shift or Control keys while switching signal inputs,
 it will also suspend or power off the system, respectively.
 
 image::eizoctltray.png["eizoctltray with expanded context menu", 343, 229]
-- 
cgit v1.2.3-70-g09d2

