From ef29b7587d536bf8a9c68c0ecbe5e45cd5a3bec3 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Fri, 30 Oct 2015 23:58:29 +0100
Subject: Fix error handling in termo_strfkey()

If in any case snprintf() returned a negative value,
we would mishandle it.
---
 README.adoc | 1 +
 1 file changed, 1 insertion(+)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index ce63059..ba458c0 100644
--- a/README.adoc
+++ b/README.adoc
@@ -5,6 +5,7 @@ termo
 input.  ncurses does a really terrible job at that, mainly wrt. mouse support
 which seems to be utterly broken.  If you can drag things in a terminal
 application, such as in VIM, I can assure you it's not using ncurses for that.
+(At least not with ncurses older than 6.0.)
 
 Since terminal I/O is really complicated and full of special cases, this project
 doesn't aspire to also replace the output part of ncurses, but is rather
-- 
cgit v1.2.3

