From 5b05b96ec0cbef6ed10adb1423cdedde09ee868e Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Fri, 30 Dec 2016 08:30:59 +0100
Subject: Backport TERMKEY_FLAG_NOSTART and fix two leaks

...that are notably still present in the original library.
---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 136f893..3252c4e 100644
--- a/README.adoc
+++ b/README.adoc
@@ -39,7 +39,7 @@ statically linked against the library, and hence they can be run as they are:
 
 What's Different From the Original termkey?
 -------------------------------------------
-The main change is throwing away any UTF-8 dependent code, making the library
+The main change is throwing out any UTF-8 dependent code, making the library
 capable of handling all unibyte and multibyte encodings supported by iconv on
 your system.  The characters are still presented as Unicode in the end, however,
 as the other sensible option is wchar_t and that doesn't really work well, see
-- 
cgit v1.2.3

