From 1f2a32ed97cdfe6a389dda5f386cc501e0cf97a1 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Mon, 14 Mar 2016 21:05:43 +0100
Subject: Fix README

---
 README.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index ba458c0..136f893 100644
--- a/README.adoc
+++ b/README.adoc
@@ -1,7 +1,7 @@
 termo
 =====
 
-`termo' is a library providing an alternative to ncurses' handling of terminal
+'termo' is a library providing an alternative to ncurses' handling of terminal
 input.  ncurses does a really terrible job at that, mainly wrt. mouse support
 which seems to be utterly broken.  If you can drag things in a terminal
 application, such as in VIM, I can assure you it's not using ncurses for that.
@@ -61,7 +61,7 @@ Contributing and Support
 ------------------------
 Use this project's GitHub to report any bugs, request features, or submit pull
 requests.  If you want to discuss this project, or maybe just hang out with
-the developer, feel free to join me at irc://anathema.irc.so, channel #anathema.
+the developer, feel free to join me at irc://irc.janouch.name, channel #dev.
 
 License
 -------
-- 
cgit v1.2.3

