From e28e576fdb1b7ff25c56a6de021318677aa7235e Mon Sep 17 00:00:00 2001
From: Přemysl Eric Janouch <p@janouch.name>
Date: Sat, 24 Sep 2022 11:15:25 +0200
Subject: sdtui: improve tab bar overflow behaviour

---
 README.adoc | 1 -
 1 file changed, 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 9e95237..9667784 100644
--- a/README.adoc
+++ b/README.adoc
@@ -95,7 +95,6 @@ While I've been successfully using 'sdtui' for many years now, some issues
 should be addressed before including the software in regular Linux and/or
 BSD distributions:
 
- - The tab bar doesn't handle overflows well in the TUI.
  - The GUI is awkward to configure.
  - Lacking configuration, standard StarDict locations should be scanned.
 
-- 
cgit v1.2.3-70-g09d2

