From 4073749d3bd11d73290bc37904efd77b84272270 Mon Sep 17 00:00:00 2001
From: Přemysl Eric Janouch <p@janouch.name>
Date: Thu, 11 Aug 2022 14:15:20 +0200
Subject: Synchronize cross-compilation scripts

---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 9f53f01..2f928af 100644
--- a/README.adoc
+++ b/README.adoc
@@ -62,7 +62,7 @@ for Windows.  It isn't particularly usable on that system, if only because
 selection watching is a very X11/Wayland-specific feature.  Beware that build
 dependencies take up almost a gigabyte of disk space.
 
- $ sh cmake/Win64Depends.sh
+ $ sh -e cmake/Win64Depends.sh
  $ cmake -DCMAKE_TOOLCHAIN_FILE=cmake/Win64CrossToolchain.cmake \
    -DCMAKE_BUILD_TYPE=Release -B build
  $ cmake --build build -- package
-- 
cgit v1.2.3-70-g09d2

