From 03f2123447b1a5537db1cdde016eb87eb2d2371f Mon Sep 17 00:00:00 2001
From: Přemysl Eric Janouch <p@janouch.name>
Date: Wed, 6 Oct 2021 16:09:35 +0200
Subject: GLib-related improvements

Now all error messages produced by tools should be in the right
encoding, even if the system isn't in UTF-8.
---
 README.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index d225bbb..4f98061 100644
--- a/README.adoc
+++ b/README.adoc
@@ -31,8 +31,8 @@ a package with the latest development version from Archlinux's AUR.
 Building and Running
 --------------------
 Build dependencies: CMake, pkg-config, asciidoctor +
-Runtime dependencies: ncursesw, zlib, ICU, termo (included),
-                      glib-2.0, pango, xcb, xcb-xfixes (the latter two optional)
+Runtime dependencies: ncursesw, zlib, ICU, termo (included), glib-2.0 >= 2.38,
+                      pango, xcb, xcb-xfixes (the latter two optional)
 
  $ git clone --recursive https://git.janouch.name/p/sdtui.git
  $ mkdir sdtui/build
-- 
cgit v1.2.3-70-g09d2

