From 3832ca749fa7b788ddd9cdb149ffb32332c6e007 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Sun, 1 May 2022 18:17:51 +0200
Subject: README.adoc: circumvent an issue with libasciidoc

---
 README.adoc | 1 +
 1 file changed, 1 insertion(+)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 287141f..73703e9 100644
--- a/README.adoc
+++ b/README.adoc
@@ -19,6 +19,7 @@ Runtime dependencies: Linux, a Brother QL label printer connected over USB
  $ go get -u https://janouch.name/sklad/cmd/sklad
 
 You will need to bootstrap the database by writing a minimal 'db.json':
+
 ....
 {
 	"Password": "login-password",
-- 
cgit v1.2.3

