From d6eaf44aee86f36f73c336441cdf8a48f60c3851 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Fri, 28 Aug 2020 18:24:06 +0200
Subject: README: fix upstream URL

---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 00d22d0..5067fa4 100644
--- a/README.adoc
+++ b/README.adoc
@@ -24,7 +24,7 @@ Runtime dependencies: ncursesw, libacl
 Unfortunately most LLVM libc++ versions have a bug that crashes 'sdn' on start.
 Use GNU libstdc++ if you're affected.
 
- $ git clone https://github.com/pjanouch/sdn.git
+ $ git clone https://git.janouch.name/p/sdn.git
  $ mkdir sdn/build
  $ cd sdn/build
  $ cmake .. -DCMAKE_INSTALL_PREFIX=/usr -DCMAKE_BUILD_TYPE=Debug
-- 
cgit v1.2.3

