From c07f557c1613c7b962c51206415db911090bdd0d Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Thu, 1 Oct 2020 08:36:31 +0200
Subject: README.adoc: clarify bash problems

I've also tried tcsh but while it /can/ be used for directory
navigation, it has several issues that are much more serious.
---
 README.adoc | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index b63ea94..18f922a 100644
--- a/README.adoc
+++ b/README.adoc
@@ -87,8 +87,9 @@ bind \eo sdn-navigate
 
 bash
 ~~~~
-Here we can't reset the prompt from within a `bind -x` handler but there is
-an acceptable workaround that sadly submits a blank line:
+Here we can't make the shell update the prompt on directory changes since
+there's no way to invoke `prompt_again()` from a `bind -x` handler but we can
+work around it by submitting a blank line:
 
 ----
 sdn-navigate () {
-- 
cgit v1.2.3

