From d3d709e994061108d594361607c92d65455ac2ba Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Fri, 11 Mar 2016 20:34:38 +0100
Subject: Fix packaging, update README

---
 README.adoc | 13 +++++++++++--
 1 file changed, 11 insertions(+), 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 8b1ee31..dedec3f 100644
--- a/README.adoc
+++ b/README.adoc
@@ -15,8 +15,17 @@ So far there are some problems with reliability, and some clever algorithm to
 avoid overloading the network is needed.  Until then, you can use ulimit to cap
 the maximum number of concurrent connections.
 
-Building and Running
---------------------
+Packages
+--------
+Regular releases are sporadic.  git master should be stable enough.  You can get
+a package with the latest development version from Archlinux's AUR, or from
+openSUSE Build Service for the rest of mainstream distributions.  Consult the
+list of repositories and their respective links at:
+
+https://build.opensuse.org/project/repositories/home:pjanouch:git
+
+Building and Usage
+------------------
 Build dependencies: CMake, pkg-config, help2man +
 Runtime dependenices: curses, openssl, Jansson, lua = 5.3 (optional)
 
-- 
cgit v1.2.3

