From 796a9640d36328465cef66752a811eac5f7b3da5 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Fri, 4 Sep 2020 18:33:12 +0200
Subject: Make it possible to change the signature reservation

---
 README.adoc | 6 ++++--
 1 file changed, 4 insertions(+), 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 6e7acd3..595ac4b 100644
--- a/README.adoc
+++ b/README.adoc
@@ -9,8 +9,6 @@ the Cairo library.  As such, it currently comes with some restrictions:
    overwritten
  * the document may not employ cross-reference streams, or must constitute
    a hybrid-reference file at least
- * the signature may take at most 4 kilobytes as a compile-time limit,
-   which should be enough space even for one intermediate certificate
 
 The signature is attached to the first page and has no appearance.
 
@@ -37,6 +35,10 @@ Usage
 
  $ ./pdf-simple-sign document.pdf document.signed.pdf KeyAndCerts.p12 password
 
+If the signature doesn't fit within the default reservation of 4 kibibytes,
+you might need to adjust it using the `-r` option, or throw out any unnecessary
+intermediate certificates.
+
 Contributing and Support
 ------------------------
 Use https://git.janouch.name/p/pdf-simple-sign to report bugs, request features,
-- 
cgit v1.2.3

