From 69b939c707c38be9e1ca1e671560ff385729a2d0 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Wed, 28 Jun 2023 23:12:42 +0200
Subject: Fix tests, document new limitation

---
 README.adoc | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 50dc9e6..0a5c3fa 100644
--- a/README.adoc
+++ b/README.adoc
@@ -2,7 +2,8 @@ pdf-simple-sign
 ===============
 
 'pdf-simple-sign' is a simple PDF signer intended for documents produced by
-the Cairo library, GNU troff, ImageMagick, or similar.
+the Cairo library (≤ 1.17.4 or using PDF 1.4), GNU troff, ImageMagick,
+or similar.
 
 I don't aim to extend the functionality any further.  The project is fairly
 self-contained and it should be easy to grasp and change to suit to your needs.
-- 
cgit v1.2.3

