From 43ca0e5035b6951297715a211b73d8db5f751f15 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p@janouch.name>
Date: Tue, 2 Oct 2018 23:19:38 +0200
Subject: Add a Go port

It should be roughly at feature parity.
---
 README.adoc | 8 ++++++--
 1 file changed, 6 insertions(+), 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index d20ff8a..59bfdef 100644
--- a/README.adoc
+++ b/README.adoc
@@ -2,8 +2,8 @@ pdf-simple-sign
 ===============
 :compact-option:
 
-'pdf-simple-sign' is a simple open source PDF signer intended for documents
-generated by Cairo.  As such, it currently comes with some restrictions:
+'pdf-simple-sign' is a simple PDF signer intended for documents produced by
+the Cairo library.  As such, it currently comes with some restrictions:
 
  * the document may not have any forms or signatures already, as they will be
    overwitten
@@ -30,6 +30,10 @@ Runtime dependencies: libcrypto (OpenSSL 1.1 API)
  $ cd builddir
  $ ninja
 
+In addition to the C++ version, also included is a native Go port:
+
+ $ go get janouch.name/pdf-simple-sign/cmd/pdf-simple-sign
+
 Usage
 -----
 
-- 
cgit v1.2.3

