From 2d08100b58b6c7e06f124aef3e2761bcdaeac85b Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Fri, 4 Sep 2020 17:16:42 +0200
Subject: Avoid downgrading the document's PDF version

---
 README.adoc | 2 --
 1 file changed, 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 46bc9ed..6e7acd3 100644
--- a/README.adoc
+++ b/README.adoc
@@ -9,8 +9,6 @@ the Cairo library.  As such, it currently comes with some restrictions:
    overwritten
  * the document may not employ cross-reference streams, or must constitute
    a hybrid-reference file at least
- * the document may not be newer than PDF 1.6 already, or it will get downgraded
-   to that version
  * the signature may take at most 4 kilobytes as a compile-time limit,
    which should be enough space even for one intermediate certificate
 
-- 
cgit v1.2.3

