From 1224d9be47e5235f39556d9118c9893ee6e68a4c Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Fri, 4 Sep 2020 15:34:33 +0200
Subject: Return errors rather than mangle documents

---
 README.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 59bfdef..46bc9ed 100644
--- a/README.adoc
+++ b/README.adoc
@@ -5,8 +5,8 @@ pdf-simple-sign
 'pdf-simple-sign' is a simple PDF signer intended for documents produced by
 the Cairo library.  As such, it currently comes with some restrictions:
 
- * the document may not have any forms or signatures already, as they will be
-   overwitten
+ * the document may not have any forms or signatures already, as they would be
+   overwritten
  * the document may not employ cross-reference streams, or must constitute
    a hybrid-reference file at least
  * the document may not be newer than PDF 1.6 already, or it will get downgraded
-- 
cgit v1.2.3

