From f05be01fba0113c324e0051b8997ef8c2ed90722 Mon Sep 17 00:00:00 2001
From: Přemysl Eric Janouch <p@janouch.name>
Date: Tue, 30 May 2023 15:15:20 +0200
Subject: Change volume adjustment key bindings

Use the much more obvious ones.
---
 nncmpp.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'nncmpp.adoc')

diff --git a/nncmpp.adoc b/nncmpp.adoc
index 5b1cfdb..2fc8361 100644
--- a/nncmpp.adoc
+++ b/nncmpp.adoc
@@ -117,8 +117,8 @@ as in the snippet above.  To replace the default volume control bindings, use:
 
 ....
 normal = {
-  "M-PageUp" = "pulse-volume-up"
-  "M-PageDown" = "pulse-volume-down"
+  "+" = "pulse-volume-up"
+  "-" = "pulse-volume-down"
 }
 ....
 
-- 
cgit v1.2.3-54-g00ecf

