From 31d975604b3b016b356811a47adda3729d625fa1 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Sat, 10 Feb 2024 10:21:09 +0100
Subject: README.adoc: remove unintended line break

---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 4e4dcd3..1a0f199 100644
--- a/README.adoc
+++ b/README.adoc
@@ -44,7 +44,7 @@ Build-only dependencies: CMake, pkg-config, awk, liberty (included),
  termo (included), asciidoctor or asciidoc (recommended but optional),
  rsvg-convert (X11) +
 Runtime dependencies: ncursesw, libunistring, cURL +
-Optional runtime dependencies: fftw3, libpulse, x11 + xft + libpng (X11), +
+Optional runtime dependencies: fftw3, libpulse, x11 + xft + libpng (X11),
  Perl + cURL (lyrics)
 
  $ git clone --recursive https://git.janouch.name/p/nncmpp.git
-- 
cgit v1.2.3

