From 033fe31b7b6da73d30873038cba1557026a2df86 Mon Sep 17 00:00:00 2001
From: Přemysl Janouch <p@janouch.name>
Date: Wed, 27 Jun 2018 04:13:16 +0200
Subject: User documentation: update pictures

The one depicting symbol selection has been removed since it's no longer
deemed useful: the status bar hint on startup should be enough.

There is no need for a separate picture in the project root anymore.
---
 docs/user-guide/user-guide-en.asciidoc | 8 ++------
 1 file changed, 2 insertions(+), 6 deletions(-)

(limited to 'docs/user-guide/user-guide-en.asciidoc')

diff --git a/docs/user-guide/user-guide-en.asciidoc b/docs/user-guide/user-guide-en.asciidoc
index 7af7cd1..c7453ef 100644
--- a/docs/user-guide/user-guide-en.asciidoc
+++ b/docs/user-guide/user-guide-en.asciidoc
@@ -101,12 +101,8 @@ Inserting symbols
 ~~~~~~~~~~~~~~~~~
 _Symbols_ constitute the most important kind of objects. Insert them into the
 diagram by choosing one from the symbol menu located on the left side of the
-main application window, see <<select-symbol>>, and dragging it onto the diagram
-where you want the symbol to be placed.
-
-[[select-symbol]]
-.Choosing a symbol from the menu
-image::select-symbol.png[]
+main application window and dragging it onto the diagram where you want the
+symbol to be placed.
 
 Rotating symbols
 ~~~~~~~~~~~~~~~~
-- 
cgit v1.3

