From 42b6da1ffe7d489d237a33b73f3d31392a41a856 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Fri, 22 Oct 2021 14:41:37 +0200
Subject: README: fix cross-building instructions

Copy-pasting and exhaustion do not go well together.
---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 6f9d848..fbd7109 100644
--- a/README.adoc
+++ b/README.adoc
@@ -99,7 +99,7 @@ Just install MinGW-w64 and let automation take care of the rest.
 
 Alternatively, for an unnecessarily bloated MSYS2-based 64-bit build:
 
- $ sh Win64Depends.cmake
+ $ sh Win64Depends.sh
  $ cmake -DCMAKE_TOOLCHAIN_FILE=ToolchainCrossWin64.cmake \
    -DCMAKE_BUILD_TYPE=Release -B build
  $ cmake --build build -- package
-- 
cgit v1.2.3

