From 3a087ad581f2e15451bfc12d8ad520422a92f4a8 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Sat, 23 Oct 2021 14:09:55 +0200
Subject: Remove unnecessary DLLs from Windows builds

This saves 20 MiB and 4 MiB of libraries in MSYS2 and bundle
builds respectively, in total, without any adverse effects.

The MSYS2 build remains bloated, due to the Adwaita icon theme.

Bump minimum CMake version to avoid a bug.
---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index ab899d8..81c95dc 100644
--- a/README.adoc
+++ b/README.adoc
@@ -15,7 +15,7 @@ a package with the latest development version from Archlinux's AUR.
 Requirements
 ------------
 Runtime dependencies: GTK+ >= 3.8, json-glib >= 0.10.4, lua >= 5.2 +
-Build dependencies: CMake >= 3.9
+Build dependencies: CMake >= 3.10
 
 Build from source on Unix-like systems
 --------------------------------------
-- 
cgit v1.2.3

