From 033fe31b7b6da73d30873038cba1557026a2df86 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p@janouch.name>
Date: Wed, 27 Jun 2018 04:13:16 +0200
Subject: User documentation: update pictures

The one depicting symbol selection has been removed since it's no longer
deemed useful: the status bar hint on startup should be enough.

There is no need for a separate picture in the project root anymore.
---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index e81fcdd..4b4d505 100644
--- a/README.adoc
+++ b/README.adoc
@@ -6,7 +6,7 @@ logdiag
 This software is considered to be of alpha quality and isn't recommended for
 regular usage.
 
-image::logdiag.png[align="center"]
+image::docs/user-guide/logdiag-en.png[align="center"]
 
 Packages
 --------
-- 
cgit v1.2.3

