From 1051ad555ac9ac98a41aa0efa675ce4a1d009e1c Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Sun, 13 Mar 2016 16:40:49 +0100
Subject: Update README

---
 README.adoc | 8 +++++++-
 1 file changed, 7 insertions(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 81b9b27..58ea5e2 100644
--- a/README.adoc
+++ b/README.adoc
@@ -15,7 +15,13 @@ The API is intentionally unstable, which allows for easy refactoring.
 
 All development is done on Linux, but other POSIX-compatible operating systems
 should be supported as well.  They have an extremely low priority, however, and
-I'm not testing them at all.
+I'm not testing them at all, with the exception of OpenBSD.
+
+Contributing and Support
+------------------------
+Use this project's GitHub to report any bugs, request features, or submit pull
+requests.  If you want to discuss this project, or maybe just hang out with
+the developer, feel free to join me at irc://irc.janouch.name, channel #dev.
 
 License
 -------
-- 
cgit v1.2.3

