From 4023155b67f5f7d13e90f61bcbc501829e8bc0ff Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Fri, 30 Sep 2022 14:47:24 +0200
Subject: Improve link detection suppression in man page

---
 json-rpc-shell.adoc | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'json-rpc-shell.adoc')

diff --git a/json-rpc-shell.adoc b/json-rpc-shell.adoc
index cbcfee8..cabc6bb 100644
--- a/json-rpc-shell.adoc
+++ b/json-rpc-shell.adoc
@@ -14,8 +14,9 @@ Synopsis
 
 Description
 -----------
+:colon: :
 The _ENDPOINT_ must be either an HTTP or a WebSocket URL, with or without TLS
-(i.e. one of the _+++http+++://_, _+++https+++://_, _ws://_, _wss://_ schemas).
+(i.e. one of the _http{colon}//_, _https{colon}//_, _ws://_, _wss://_ schemas).
 
 *json-rpc-shell* will use it to send any JSON-RPC 2.0 requests you enter on its
 command line. The server's response will be parsed and validated, stripping it
-- 
cgit v1.2.3

