From f543a46118cb4de16310863a8432afeb639b9216 Mon Sep 17 00:00:00 2001
From: Přemysl Eric Janouch <p@janouch.name>
Date: Sat, 29 Nov 2025 23:44:36 +0100
Subject: README.adoc: make quick'n'dirty instructions work

Without the compiled schemas, fiv doesn't launch at all.
---
 README.adoc | 1 +
 1 file changed, 1 insertion(+)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 8994759..5645d72 100644
--- a/README.adoc
+++ b/README.adoc
@@ -68,6 +68,7 @@ you can get a quick and dirty installation package for testing purposes using:
 
  $ meson compile deb
  # dpkg -i fiv-*.deb
+ # glib-compile-schemas /usr/local/share/glib-2.0/schemas
 
 Windows
 ~~~~~~~
-- 
cgit v1.2.3-70-g09d2

