From c597e7bc2c073cb40e8cccc9e9bc13048ab712d0 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Tue, 23 Nov 2021 14:58:21 +0100
Subject: Update README

---
 README.adoc | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 50b4898..769c3f9 100644
--- a/README.adoc
+++ b/README.adoc
@@ -44,6 +44,8 @@ _~/.config/gtk-3.0/gtk.css_:
 
  fastiv-browser { -FastivBrowser-spacing: 0; padding: 0; border: 0; margin: 0; }
 
+The GTK+ inspector will be very helpful, should you want to experiment.
+
 Contributing and Support
 ------------------------
 Use https://git.janouch.name/p/fastiv to report any bugs, request features,
-- 
cgit v1.2.3

