From 86622e0c311a80bb26666688b88b8c5d853119e5 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Thu, 22 Jun 2023 01:48:02 +0200
Subject: Make cross-compilation scripts work from MSYS2

This is weird and runs very slowly.

Meson can also find libraries outside the subroot,
in particular the fast float plugin.
---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 0e36c48..a06b97c 100644
--- a/README.adoc
+++ b/README.adoc
@@ -64,7 +64,7 @@ from a context menu.
 Windows
 ~~~~~~~
 'fiv' can be cross-compiled for Windows, provided that you install a bunch of
-dependencies listed at the beginning of 'msys2-cross-configure.sh',
+dependencies listed at the beginning of 'msys2-configure.sh',
 plus rsvg-convert from librsvg2, and icotool from icoutils.
 Beware that the build will take up about a gigabyte of disk space.
 
-- 
cgit v1.2.3

