From 7cbd24dd2f99c160b0e4c9765783b2294caca6dc Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Thu, 11 Aug 2022 14:49:23 +0200
Subject: Bundle a fuller installation of Perl/ExifTool

wperl is necessary to get rid of the console window,
which is merely one of several issues with the PAR Packer-based
ExifTool bundle used in the last commit.

The Perl installation could be heavily trimmed down,
but it seems to require a very manual process.
---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 2dc1464..40fc97c 100644
--- a/README.adoc
+++ b/README.adoc
@@ -61,7 +61,7 @@ Windows
 'fiv' can be cross-compiled for Windows, provided that you install a bunch of
 dependencies listed at the beginning of 'msys2-cross-configure.sh',
 plus rsvg-convert from librsvg2, and icotool from icoutils.
-Beware that the build will take up close to a gigabyte of disk space.
+Beware that the build will take up about a gigabyte of disk space.
 
  $ sh -e msys2-cross-configure.sh builddir
  $ meson install -C builddir
-- 
cgit v1.2.3

