From 6a7c86a41b9cb4938a0de02e3ceb06f113350ffb Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Sun, 4 Jun 2023 12:03:42 +0200
Subject: Remove a macOS rendering bug workaround

Most important Cairo bugs seem to have been fixed recently.
---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 30a0f91..66ce631 100644
--- a/README.adoc
+++ b/README.adoc
@@ -2,7 +2,7 @@ fiv
 ===
 
 'fiv' is a slightly unconventional, general-purpose image browser and viewer
-for Linux (that said, macOS and Windows ports are possible).
+for Linux (as well as macOS and Windows, though these have known issues).
 
 image::docs/fiv.webp["Screenshot of both the browser and the viewer"]
 
-- 
cgit v1.2.3

