From 61e969d54f77aa385dc651427c175f65888b931d Mon Sep 17 00:00:00 2001
From: Přemysl Eric Janouch <p@janouch.name>
Date: Mon, 20 Sep 2021 20:06:38 +0200
Subject: WIP: Update README.adoc

WIP: Waiting for the article to be finished, which requires resolving
certain issues first.
---
 README.adoc | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 07cf5ce..9101bc6 100644
--- a/README.adoc
+++ b/README.adoc
@@ -6,6 +6,9 @@ for Linux and Windows (macOS still has major issues).
 
 image::docs/fiv.webp["Screenshot of both the browser and the viewer"]
 
+See https://p.janouch.name/text/replacing-eog-and-nautilus.html[the accompanying article]
+for some context.
+
 Features
 --------
  - Uses a compact thumbnail view, helping you browse collections comfortably.
-- 
cgit v1.2.3-70-g09d2

