From 4fcc506d846129da1daa0d0e3e05aaa771e4f295 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Fri, 22 Jul 2022 19:35:03 +0200
Subject: Update README.adoc

---
 README.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 965cb62..0ace297 100644
--- a/README.adoc
+++ b/README.adoc
@@ -1,7 +1,8 @@
 fiv
 ===
 
-'fiv' is a slightly unconventional, general-purpose image browser and viewer.
+'fiv' is a slightly unconventional, general-purpose image browser and viewer
+for Linux (that said, macOS and Windows ports are possible).
 
 image::docs/fiv.webp["Screenshot of both the browser and the viewer"]
 
@@ -23,7 +24,6 @@ Explicit non-goals
    nothing beyond the most basic of adjustments is desired.
  - Following the latest GNOME HIG to the letter--header bars are deliberately
    avoided, for their general user hostility.
- - Portability to non-UNIXy systems, although patches are welcome.
  - Memory efficiency is secondary to both performance and development effort.
 
 Aspirations
-- 
cgit v1.2.3

