From 1a163bdb8b4878f456fb04b33978a92f3fcd8e91 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Eric=20Janouch?= <p@janouch.name>
Date: Thu, 11 Aug 2022 11:36:31 +0200
Subject: Resolve a few issues with MSYS2 cross-builds

 - Fix launching of subprocesses (missing gspawn helpers).
 - Discard unused GSettings schemas.
 - Make the program find its user guide.
 - Bundle a somewhat suboptimal version of ExifTool.
---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 031b110..2dc1464 100644
--- a/README.adoc
+++ b/README.adoc
@@ -63,7 +63,7 @@ dependencies listed at the beginning of 'msys2-cross-configure.sh',
 plus rsvg-convert from librsvg2, and icotool from icoutils.
 Beware that the build will take up close to a gigabyte of disk space.
 
- $ sh msys2-cross-configure.sh builddir
+ $ sh -e msys2-cross-configure.sh builddir
  $ meson install -C builddir
 
 If everything succeeds, you will find a portable build of the application
-- 
cgit v1.2.3

