From 365d6e69e17e44f972934fd9582a01cc03754fe1 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Thu, 18 May 2017 20:45:46 +0200
Subject: Various mostly safety fixes

---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 3ac6f15..376edfc 100644
--- a/README.adoc
+++ b/README.adoc
@@ -47,7 +47,7 @@ Runtime
 -------
 All variables are put in a single global namespace with no further scoping.
 When calling a command (which is a list of lists), all arguments are
-automatically stored in variables named 1, 2, 3, ... n.  They are however
+automatically stored in variables named 0, 1, 2, 3, ... n.  They are however
 effectively inaccessible and you must rename them first using the `arg` special
 form.
 
-- 
cgit v1.2.3

