LIUST-50
========

Included here are a simulator for the Toshiba Tec LIUST-A00 (LIUST-50)
VFD line display, and a status program sending data to the device.

For device documentation, see https://github.com/boricha/M202MD12D which is
seemingly a project for the later LIUST-A10.

Device setup
------------
 # stty -F /dev/ttyS0 9600 parenb oddp -crtscts -cstopb cs8

Running
-------
 # liustatus > /dev/ttyS0

 $ liustatus | liustsim
