From 4fb06d3b11f371451382bdb5a50e2dee7d19013c Mon Sep 17 00:00:00 2001
From: Přemysl Eric Janouch <p@janouch.name>
Date: Sun, 5 Oct 2025 17:02:02 +0200
Subject: WIP: Add Toshiba Tec LIUST-A00 utilities

WIP: It still needs some cleanup.
---
 liust-50/README.adoc | 18 ++++++++++++++++++
 1 file changed, 18 insertions(+)
 create mode 100644 liust-50/README.adoc

(limited to 'liust-50/README.adoc')

diff --git a/liust-50/README.adoc b/liust-50/README.adoc
new file mode 100644
index 0000000..0ffeaaf
--- /dev/null
+++ b/liust-50/README.adoc
@@ -0,0 +1,18 @@
+LIUST-50
+========
+
+Included here are a simulator for the Toshiba Tec LIUST-A00 (LIUST-50)
+VFD line display, and a status program sending data to the device.
+
+For device documentation, see https://github.com/boricha/M202MD12D which is
+seemingly a project for the later LIUST-A10.
+
+Device setup
+------------
+ # stty -F /dev/ttyS0 9600 parenb oddp -crtscts -cstopb cs8
+
+Running
+-------
+ # liustatus > /dev/ttyS0
+
+ $ liustatus | liustsim
-- 
cgit v1.2.3-70-g09d2

