From fee703567f1b5fce7d7ff2118024b39577bf8711 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Thu, 9 Feb 2017 20:12:09 +0100
Subject: Add input-switch

Moving common stuff for DDC/CI communicating programs to ddc-ci.c.
---
 README.adoc | 1 +
 1 file changed, 1 insertion(+)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 0d3ab97..d1bdf0c 100644
--- a/README.adoc
+++ b/README.adoc
@@ -9,6 +9,7 @@ to other people as well:
    includes PulseAudio volume management and hand-written NUT and MPD clients,
    all in the name of liberation from GPL-licensed software of course.
  - 'brightness' allows me to change the brightness of w/e display device I have.
+ - 'input-switch' likewise switches the input source of external displays.
  - 'fancontrol-ng' is a clone of fancontrol that can handle errors on resume
    from suspend instead of setting fans to maximum speed and quitting;
    in general it doesn't handle everything the original does
-- 
cgit v1.2.3

