From 99081814671c28f30540e81af7ae73096ba4b9e0 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Fri, 22 Jan 2016 08:59:58 +0100
Subject: Add shellify

---
 README.adoc | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 26c99c1..10c28a5 100644
--- a/README.adoc
+++ b/README.adoc
@@ -12,6 +12,8 @@ to other people as well.
  - 'fancontrol-ng' is a clone of fancontrol that can handle errors on resume
    from suspend instead of setting fans to maximum speed and quitting;
    in general it doesn't handle everything the original does
+ - 'shellify' is a simple script that sets up a shell for commands like vgdb
+   and nmcli that are painfully lacking it
 
 Don't expect them to work under any OS that isn't Linux.
 
-- 
cgit v1.2.3

