From 8146e336d7057d2064ed43e6684a11f601c84f47 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Fri, 22 Jan 2016 08:56:34 +0100
Subject: Add fancontrol-ng

---
 README.adoc | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index b0f884b..26c99c1 100644
--- a/README.adoc
+++ b/README.adoc
@@ -7,8 +7,11 @@ to other people as well.
 
  - 'dwmstatus' does literally everything my dwm doesn't but I'd like it to. It
    includes PulseAudio volume management and hand-written NUT and MPD clients,
-   all in the name of liberation from GPL-licensed software of course
+   all in the name of liberation from GPL-licensed software of course.
  - 'brightness' allows me to change the brightness of w/e display device I have.
+ - 'fancontrol-ng' is a clone of fancontrol that can handle errors on resume
+   from suspend instead of setting fans to maximum speed and quitting;
+   in general it doesn't handle everything the original does
 
 Don't expect them to work under any OS that isn't Linux.
 
-- 
cgit v1.2.3

