From 74d634e562323265e8d207200395c2c91cc19299 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Sun, 14 Feb 2016 19:28:22 +0100
Subject: Add siprandom

Based on an idea I got from a talk.
---
 README.adoc | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index acf7593..008f01a 100644
--- a/README.adoc
+++ b/README.adoc
@@ -3,7 +3,7 @@ desktop-tools
 :compact-option:
 
 'desktop-tools' is a collection of tools to run my desktop that might be useful
-to other people as well.
+to other people as well:
 
  - 'dwmstatus' does literally everything my dwm doesn't but I'd like it to. It
    includes PulseAudio volume management and hand-written NUT and MPD clients,
@@ -16,6 +16,8 @@ to other people as well.
    and nmcli that are painfully lacking it
  - 'gdm-switch-user' tells the running GDM daemon, if any, to show the switch
    user screen
+ - 'siprandom' uses the SipHash 2-4 algorithm to produce a stream of
+   pseudo-random data; it should be fast enough to saturate most devices
 
 Don't expect them to work under any OS that isn't Linux.
 
-- 
cgit v1.2.3

