From 2825c899617cefc872198296f83572ec3504db93 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Wed, 27 Jan 2016 20:22:49 +0100
Subject: Add gdm-switch-user, run by dwmstatus

---
 README.adoc | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 10c28a5..acf7593 100644
--- a/README.adoc
+++ b/README.adoc
@@ -14,6 +14,8 @@ to other people as well.
    in general it doesn't handle everything the original does
  - 'shellify' is a simple script that sets up a shell for commands like vgdb
    and nmcli that are painfully lacking it
+ - 'gdm-switch-user' tells the running GDM daemon, if any, to show the switch
+   user screen
 
 Don't expect them to work under any OS that isn't Linux.
 
-- 
cgit v1.2.3

