From 047a55640ce4c194e5b99266b59d4175efeae058 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Thu, 6 Jul 2017 12:45:58 +0200
Subject: Add iexec

---
 README.adoc | 6 ++++--
 1 file changed, 4 insertions(+), 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 63c919b..595d5f9 100644
--- a/README.adoc
+++ b/README.adoc
@@ -13,10 +13,12 @@ to other people as well:
  - 'fancontrol-ng' is a clone of fancontrol that can handle errors on resume
    from suspend instead of setting fans to maximum speed and quitting;
    in general it doesn't handle everything the original does
- - 'priod' sets CPU, I/O and OOM killer priorities for new processes according
-   to configuration
+ - 'priod' sets process CPU, I/O and OOM killer priorities automatically
+   according to configuration
  - 'shellify' is a simple script that sets up a shell for commands like vgdb
    and nmcli that are painfully lacking it
+ - 'iexec' runs a program and attempts to restart it cleanly when the
+   executable file is replaced on the disk
  - 'gdm-switch-user' tells the running GDM daemon, if any, to show the switch
    user screen
  - 'siprandom' uses the SipHash 2-4 algorithm to produce a stream of
-- 
cgit v1.2.3

