From 99330e88f23a7e5aa0758bb9c934db395950ab2d Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?P=C5=99emysl=20Janouch?= <p.janouch@gmail.com>
Date: Thu, 22 Dec 2016 23:40:30 +0100
Subject: Update READMEs

---
 README.adoc | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 660c38c..e04e8bd 100644
--- a/README.adoc
+++ b/README.adoc
@@ -29,8 +29,9 @@ Usage
 
  ./bfc-amd64-linux [INPUT-FILE] [OUTPUT-FILE]
 
-When no input file is specified, stdin is used.  Similarly, the default output
-filename is a.out.  The resulting file can be run on the target platform.
+When no input file is specified, standard input is used.  Similarly, the default
+output filename is `a.out`.  After the compilation, the resulting file can be
+run on the target platform.
 
 Contributing and Support
 ------------------------
-- 
cgit v1.2.3

